10^{-3}

10^{-2}

0.7 0.8 0.9 1

sin^22θ

Δm^2 (eV^2)

68% C.L.

90% C.L.

99% C.L.

0 2.5 5 7.5 10 12.5 15 17.5 20

10^{-3} 10^{-2}

Δm^2 (eV^2) χ^2 - χ^{2min}

68% C.L.

90% C.L.

99% C.L.

0 2.5 5 7.5 10 12.5 15 17.5 20

0.8 0.85 0.9 0.95 1 1.05 1.1 1.15

sin^22θ χ^2 - χ^{2min}

68% C.L.

90% C.L.

99% C.L.