Energy (MeV)

Number of events

Off-axis angle = 1.5˚

Signal δ_{CP}=-135˚ N = 1275.66

Signal δ_{CP}=45˚ N = 961.768

Signal δ_{CP}=0˚

N = 1072.36

All BG (ν_e MC) N = 743.755 Beam ν_e BG (MC) N = 331.662

0 25 50 75 100 125 150 175 200 225

10^3