Energy (MeV)

Number of events

Off-axis angle = 2.0˚

Signal δ_{CP}=-135˚ N = 1031.93

Signal δ_{CP}=45˚ N = 744.034

Signal δ_{CP}=0˚

N = 864.224

All BG (ν_e MC) N = 529.004 Beam ν_e BG (MC) N = 311.323

0 25 50 75 100 125 150 175 200 225

10^3