Energy (MeV)

Number of events

Off-axis angle = 1.0˚

Signal δ_{CP}=-135˚ N = 3700.47

Signal δ_{CP}=45˚ N = 2438.63

Signal δ_{CP}=0˚

N = 2809.43

All BG (ν_e MC) N = 1501.44 Beam ν_e BG (MC) N = 438.586

0

50

100

150

200

250

10^3