0 0.5 1

0 0.5 1

Neutrino Energy (GeV)

10^{-1} 1 10 10^2 0 0.5 1

L= 25 km

L= 500 km

L= 10000 km

Δm2= .005 eV2

cos θ =-.8, L= 10000 km

Pνν’ = sin^22θ sin^21.27 Δm 2L E cos θ = .8, L= 25 km cos θ = 0 L= 500 km θ L Earth

Detector